〉η/d_{ch}Nd〈 /η/d_{ch}Nd

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5

FBR

0.2 0.4 0.6 0.8 1 1.2 = 5.02 TeV NNs ALICE p-Pb ψ Inclusive J/ < -2.96)_{cms}y(-4.46 < _{pPb}R < 3.53)/ cms y (2.03 < pPb R